930 935 940 945 950

340 350 360 370 380 390 400 410 420 430

0 2 4 6 8

340 350 360 370 380 390 400 410 420 430

Run (613)

Avg Timeing (ns)

Run (613)

Timeing dist var (ns)

Run (613)

Avg SigmaTime (ns)

1.5 2 2.5 3

340 350 360 370 380 390 400 410 420 430