Month-Day,Year

_____-___, _____ Shift member name(s):

                                                    Shift Room: O2, CH4 check sheet

                                                    WaterSystem tent (check OK?)

                                                    Muon gas tent (No beep?)

                                                    Ground floor (0.4W fan ON?)

                                                    In pressure

                                                    Out pressure

                                                    U flow rate

                                                    L flow rate

                                                    Temperature

                                                    Atmospheric pressure

                                                    Air-con of SCIFI ON?

                                                    Air-con of LeadGlass ON?

                                                    Air-con of Elec.hut ON?

                                                    8V PowerSupplies ON?
(14 green LEDs)

                                                    Muon HV ON?
                                                                                                   (16 red LEDs)

                                                    Lead Glass HV ON?

                                                    Fastbus Supply ON?
                                                                                                                       (displays >0.0)

                                                    No Smoke? No Fire? No Water?

                                                    HV ON?
                                                                                (red)

                                                    Elec. crates No alarm?

                                                    No water dripping?

                                                    SCIFI black sheets closed?

                                                    Compensation coil ON?

                                                    Water circulation pump ON?

                                                    No water leak (<1 l/min)?

                                                    1kt WaterSystem WEBmonitor OK?

                                                    http://neutrino.kek.jp/shift/monitor/watersys/shift/

                                                    Data taking console OK? (nupc11) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    SCIFI Nhit monitor OK?

                                                    http://neutrino.kek.jp/~online/scimon/

___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    FGD slow monitor OK?

                                                    http://nufdsl.kek.jp/~online/muon/slow/

___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    FGD event display OK? (nupc03) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    Histogram (PAW) check OK? (nupc03) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    1kt event display OK? (cuttlefish) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    1kt slow control monitor OK? (nupc22) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    Change run if >12 hours

                                                    Fill out summary.txt at neutrino

                                                    Clean up shift room (or keep clean)

                                                    1-week summary to steering comm.

                       and available for printout in NuHall on  nupc03 at  /home/online/nuhall_shift_check_list.ps

A-Shift (09:00-) B-Shift (17:00-) C-Shift (01:00-)

______________ ______________ ______________

Shift credit punchclock pushed?

http://neutrino.kek.jp/shift/virtual_punchclock/k2k_shift_credit.html

______________

______________

______________

______________

Read values

on muon gas

______________

______________

______________

______________

______________

______________

Electronics

hut

SCIFI

electronics

1kt:

______________

______________

______________

______________

______________

______________

______________

______________

______________

______________

Hardware check - above ground level:

______________

______________

______________

______________

______________

______________

______________ ______________

         This page is posted on the Web at  http://neutrino.kek.jp/shift/manuals/nuhall_shift_check_list.ps

______________

______________

Check at Shift Room:

______________ ______________

______________

______________

Hardware check - underground:

______________ ______________

______________ ______________

______________

______________

______________ ______________

______________ ______________

______________

______________

______________ ______________

______________ ______________

______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

______________

______________ ______________

______________ ______________

______________ ______________

______________ ______________

(thursdays A-shift only)

                                                  K2K Shift at Neutrino Hall  -  Check List

version: April 5, 2001

______________ ______________

______________ ______________ ______________

Month-Day,Year

_____-___, _____ Shift member name(s):

                                                    Shift Room: O2, CH4 check sheet

                                                    WaterSystem tent (check OK?)

                                                    Muon gas tent (No beep?)

                                                    Ground floor (0.4W fan ON?)

                                                    In pressure

                                                    Out pressure

                                                    U flow rate

                                                    L flow rate

                                                    Temperature

                                                    Atmospheric pressure

                                                    Air-con of SCIFI ON?

                                                    Air-con of LeadGlass ON?

                                                    Air-con of Elec.hut ON?

                                                    8V PowerSupplies ON?
(14 green LEDs)

                                                    Muon HV ON?
                                                                                                   (16 red LEDs)

                                                    Lead Glass HV ON?

                                                    Fastbus Supply ON?
                                                                                                                       (displays >0.0)

                                                    No Smoke? No Fire? No Water?

                                                    HV ON?
                                                                                (red)

                                                    Elec. crates No alarm?

                                                    No water dripping?

                                                    SCIFI black sheets closed?

                                                    Compensation coil ON?

                                                    Water circulation pump ON?

                                                    No water leak (<1 l/min)?

                                                    1kt WaterSystem WEBmonitor OK?

                                                    http://neutrino.kek.jp/shift/monitor/watersys/shift/

                                                    Data taking console OK? (nupc11) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    SCIFI Nhit monitor OK?

                                                    http://neutrino.kek.jp/~online/scimon/

___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    FGD slow monitor OK?

                                                    http://nufdsl.kek.jp/~online/muon/slow/

___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    FGD event display OK? (nupc03) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    Histogram (PAW) check OK? (nupc03) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    1kt event display OK? (cuttlefish) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    1kt slow control monitor OK? (nupc22) ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___ ___

                                                    Change run if >12 hours

                                                    Fill out summary.txt at neutrino

                                                    Clean up shift room (or keep clean)

                                                    1-week summary to steering comm.

                       and available for printout in NuHall on  nupc03 at  /home/online/nuhall_shift_check_list.ps

______________ ______________

______________ (thursdays A-shift only)

______________

         This page is posted on the Web at  http://neutrino.kek.jp/shift/manuals/nuhall_shift_check_list.ps

______________

______________ ______________ ______________

______________ ______________

Check at Shift Room:

______________

______________ ______________

1kt:

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

SCIFI

electronics

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

Electronics

hut

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

______________

______________ ______________ ______________

______________ ______________

Hardware check - underground:

Read values

on muon gas

______________ ______________ ______________

______________ ______________ ______________

______________

______________ ______________ ______________

______________ ______________

Hardware check - above ground level:

______________ ______________ ______________

______________ ______________ ______________

______________ ______________ ______________

Shift credit punchclock pushed?

http://neutrino.kek.jp/shift/virtual_punchclock/k2k_shift_credit.html

______________ ______________ ______________

                                                  K2K Shift at Neutrino Hall  -  Check List

version: April 5, 2001

A-Shift (09:00-) B-Shift (17:00-) C-Shift (01:00-)