Super-Kamiokande

 Run 8356 Event 11385639

  100-02-19:18:35:49
  Inner: 2296 hits, 10885 pE
  Outer: 1 hits, 0 pE (in-time)
  Trigger ID: 0x07
  D wall: 512.3 cm
  FC mu-like, p = 1298.2 MeV/c

Charge(pe)

        >26.7
    23.3-26.7
    20.2-23.3
    17.3-20.2
    14.7-17.3
    12.2-14.7
    10.0-12.2
     8.0-10.0
     6.2- 8.0
     4.7- 6.2
     3.3- 4.7
     2.2- 3.3
     1.3- 2.2
     0.7- 1.3
     0.2- 0.7
        < 0.2

0 500 1000 1500 2000 0 92 184 276 368 460

0 Times (ns)

KEK Beam direction marked by diamond