ν_μ↔ν_τ oscillation sensitivity

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 0.2 0.4 0.6 0.8 1

22.5kton FC 1 ring μ-like

E^{rec}_ν Γ500MeV

90ΨCL 99ΨCL 99.9ΨCL

sin^22θ

Δm^2 (eV^2)