10^{-4}

10^{-3}

10^{-2}

0 0.5 1 1.5 2 2.5 3 sin^2(2θ)

Δm^2 ΜeV^2Ν

14.4%

Input: Δm^2=2.7300E-03, sin^2(2θ)=1.0000