0

1000

2000

3000

4000

5000

6000

7000

80 100 120 140 160 180 200 220

Entries Mean RMS 100000 150.9 10.83 96.44 / 89 A 0.1000E+06 316.3 μ 149.7 0.8802E-01 σ^{low} 10.04 0.5553E-01 σ^{up} 11.61 0.5704E-01

Expected # of FCFV events (null oscillation)^{ΜeventsΝ}

Μ# of virtual experimentsΝ