0

2000

4000

6000

8000

10000

12000

14000

40 50 60 70 80 90 100 110

Entries Mean RMS 100000 71.76 5.518 64.44 / 42 A 0.1000E+06 316.2 μ 71.09 0.4476E-01 σ^{low} 5.094 0.2823E-01 σ^{up} 5.928 0.2903E-01

Expected # of FCFV events K2K-II (null oscillation)

ΜeventsΝ

Μ# of virtual experimentsΝ