efficiency curve NpixCut20 Overlap60 Fc3official 3hit 2003

0

20

40

60

80

100

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Likelihood(L_pi) efficiency(%)