P_μ

FIT-n45spima12_w0011_2 Two Track ΔΘ_PΛ25^o

0

100

200

0 0.5 1 1.5 2 2.5 3 3.5 4

Entries Mean RMS 764 1.277 0.4254

Number of Events

Θ_μ 0 50 100 150

0 10 20 30 40 50 60 70 80 90

Entries Mean RMS 764 29.63 9.549

Number of Events

-Q^2 0 50 100

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Entries Mean RMS 764 0.5316 0.3155

Number of Events