n45spima11_w0000_2_fixto1_col Single Track

0 200 400 600 800 1000

1200

1400

1600

1800

0 0.5 1 1.5 2 2.5 3 3.5 4

CC 1π

CCqe other CC multi π

Coherent π

P_μ(GeV/c)

Number of Events