Merged-Fit Two Track ΔΘ_PΛ25^o

0 25 50 75 100 125 150 175 200

0 0.5 1 1.5 2 2.5 3 3.5 4

CC 1π

CCqe other CC multi π

Coherent π

P_μ(GeV/c)

Number of Events