ct diff

FC incl. out of FV

mean slope = 1.81/10^{18}POT fitted slope = 1.87 Α 0.19/10^{18}POT log likelyhood

CT diff *10^{18} POT

10^{-3}

10^{-2}

10^{-1}

1

10

0 0.5 1 1.5 2 2.5 3 3.5 4