0 50 100 150

0 1 2 0.5ΩE_νΛ1

0.5ΩE_νΛ1^Q

2(GeV/c)^2 0 50 100 150

0 1 2 1ΩE_νΛ1.5

1ΩE_νΛ1.5^Q

2(GeV/c)^2

0 20 40 60

0 1 2 1.5ΩE_νΛ2

1.5ΩE_νΛ2^Q

2(GeV/c)^2 0 10 20 30

0 1 2 2ΩE_νΛ2.5

2ΩE_νΛ2.5^Q

2(GeV/c)^2

0 2.5 5 7.5 10 12.5

0 1 2 2.5ΩE_νΛ4.0

2.5ΩE_νΛ4.0^Q

2(GeV/c)^2