1kt MCϑ P_μ vs θ_μ Distribution

P_μ (MeV/c) θ_μ (deg.)

integreted 1000ΛE_νΛ1500 Int. modeϑ QE

0 10 20 30 40 50 60 70 80 90 100

200 400 600 800 1000 1200 1400 1600