0

2000

4000

6000

8000

0 0.5 1 1.5 2 2.5

1ktϑ Reconstructed E_ν (FV25t 1-ring μ-like FC)

Data (stat.+syst.) MC

rec.E_ν ΜGeVΝ events / 0.25 GeV