Systematic Terms: + - 1) SciFi(Fid+MRD+MC)

Fiducial Cut 0.010 0.010 Muon Selection 0.039 0.039 SciFi Track 0.020 0.020 MRD Track 0.030 0.030 SciFi- MRD Match 0.010 0.010 SciFI- Veto- LG 0.010 0.010 Al Crossection 0.030 0.030 Nu Spectrum (Nov) 0.0649 0.0652 (Jun) 0.0883 0.0934 Inelastic/Elastic Ratio 0.050 0.070 CC/NC Ratio 0.020 0.020 Total (Nov) 0.098 0.110 (Jun) 0.115 0.129

2) F/N+SK+CT

F/N Event Ratio (Nov) 0.056 0.071 (Jun) 0.136 0.098 SK Det. Eff 0.030 0.030 CT Normilization Error 0.010 0.010 Total (Nov) 0.064 0.078 (Jun) 0.140 0.103

(1)SciFi+(2)F/N+SK+CT

Exp. @SK (Nov) 0.117 0.135 (Jun) 0.181 0.165