Month Jun Nov- 00Jun 01Jan- Jly Runs 125 630 Good Runs 77 230 Subruns 937 4758 Good Subruns 607 3568 3711 Spills 818158 4116481 3397764 Good Spills (SF) 463891 2978215 4550175 Good Spills (SK) 651294 3752886 4775058 POT 2.2731E18 1.58889E19 2.38124E19 CT16sum(SK) 3.0987E18 1.98461E19 2.50008E19

MUC 3D: 297 2653 4290 MUC- 1L: 100 584 811

MUC 3D(expected): 337.39 2687.06 4027.05 MUC- 1L(expected): 85.61 610.87 915.5

Data/MC 0.880 0.987 1.065 Stat .051 .019 .016 Syst(+) .101 .095 .102 Syst(- ) .113 .106 .115

Data/MC(1L) 1.17 0.96 0.89 +- .12 (Sys) +- .04 (Sys) +- .03 (Sys)

SK Expected 4.78 35.05 47.72 Stat 0.28 0.68 0.73 Syst(+) 0.86 4.11 5.60 Syst(- ) 0.79 4.71 6.42 Error all (+) 0.90 4.17 5.65 (- ) 0.84 4.76 6.46 (SciFi Only) + .61 (A) + 3.5 (A) + 3.34 (A) - .68 (A) - 3.9 (A) - 3.38 (A) Common + .67 (B) + 2.25 (B) + 4.55 (B) - .49 (B) - 2.72 (B) - 5.5 (B)

MUC 3D Total: 7240 SK Expected total: 87.547 ±1.029 st +10.57sys - 11.92sys + 10.62 - 11.964