-100 -80 -60 -40 -20 0 20 40 60 80 100 profile center x (cm)

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100

integrated day (1 data point / 5 days)

-100 -80 -60 -40 -20 0 20 40 60 80 profile center y (cm)

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

-100 -80 -60 -40 -20 0 20 40 60 80

integrated day (1 data point / 5 days)