Month Jun Nov- 00Jun Jan Feb Mar Apr 01Jan- Apr Runs 125 630 Good Runs 77 230 Subruns 937 4758 828 1093 877 Good Subruns 607 3568 828 1093 913 877 3711 Spills 818158 4116481 732069 975612 889716 800367 3397764 Good Spills (SF) 463891 2978215 629961 927483 783934 510605 2851983 Good Spills (SK) 651294 3752886 655745 962222 865759 521137 3004863 POT 2.2731E18 1.58889E19 3.07120E18 4.85673E18 4.16322E18 2.70468E18 1.47958E19 CT16sum(SK) 3.0987E18 1.98461E19 3.19641E18 5.03865E18 4.60435E18 2.76102E18 1.56004E19

MUC 3D: 297 2722 576 876 704 521 2677

MUC 3D Total: 5696 Events

SK Expected 4.78 32.68 5.78 8.76 7.50 5.12 27.16 Stat 0.28 0.63 0.24 0.30 0.28 0.22 0.52 Syst(+) 0.86 3.74 0.66 1.00 0.86 0.59 3.10 Syst(- ) 0.78 4.30 0.76 1.15 0.99 0.67 3.58 Error all (+) 0.90 3.79 0.70 1.04 0.90 0.63 3.15 (- ) 0.83 4.35 0.80 1.19 1.03 0.71 3.61

SK Expected total: 64.6 ±0.86(St) + 7.7 (Sys) - 8.66 (Sys)