Cos(Δθ) normalised to total nQE

Cos(ΔΘ) Cos(ΔΘ)

Cos(ΔΘ) Cos(ΔΘ)

0 20 40 60 80 100

-1 -0.5 0 0.5 1 0 50 100 150 200 250

-1 -0.5 0 0.5 1

0 25 50 75 100 125 150 175 200 225

-1 -0.5 0 0.5 1 0 20 40 60 80 100 120

-1 -0.5 0 0.5 1