Event Rate Stability (every 2days)

0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

0.5 x 10^{-2}

0 500 1000 1500 2000 2500 3000 3500 x 10^4 Integrated CT

Rate (E-12)/ppp