Total P.E.(ms 25t,FC)

0

500

1000

1500

2000

2500

3000

3500

4000

0 2000 4000 6000 8000 10000 12000 14000 p.e.

Total P.E.(ms 25t,FC)

0

200

400

600

800

1000

0 2000 4000 6000 8000 10000 12000 14000

DATA2000

DATA2001

p.e.

Total P.E.(ms 25t,PC)

0

200

400

600

800

1000

1200

1400

1600

1800

0 2000 4000 6000 8000 10000 12000 14000 p.e.

PE_{max}20deg(ms 25t)

0

2000

4000

6000

8000

10000

0 50 100 150 200 250 300 350 400 p.e.

PE_{max}20deg(ms 25t)

0

500

1000

1500

2000

2500

3000

0 50 100 150 200 250 300 350 400

DATA2000

DATA2001

p.e.

N_{ring}(ms 25t,FC)

0

5000

10000

15000

20000

25000

0 1 2 3 4 5 6 7 8 9 10 Φ of ring

N_{ring}(ms 25t,FC)

0

1000

2000

3000

4000

5000

6000

7000

8000

0 1 2 3 4 5 6 7 8 9 10

DATA2000

DATA2001

Φ of ring

Z (ms RΛ200cm,FC)

0

500

1000

1500

2000

2500

3000

3500

4000

-250 -200 -150 -100 -50 0 50 100 150 200 250 cm

Z (ms RΛ200cm,FC)

0

200

400

600

800

1000

1200

-250 -200 -150 -100 -50 0 50 100 150 200 250

DATA2000

DATA2001

Φ of ring

R^2 (ms -200cmΛZΛ0cm,FC)

0

200

400

600

800

1000

1200

1400

1600

1800

0 10000 20000 30000 40000 50000 60000 cm^2

R^2 (ms -200cmΛZΛ0cm,FC)

0

100

200

300

400

500

600

0 10000 20000 30000 40000 50000 60000

DATA2000

DATA2001

Φ of ring

PID probability (ms 25t,FC,1-ring)

0

2000

4000

6000

8000

10000

12000

14000

-25 -20 -15 -10 -5 0 5 10 15 20 25 PID

PID probability (ms 25t,FC,1-ring)

0

500

1000

1500

2000

2500

3000

3500

4000

4500

-25 -20 -15 -10 -5 0 5 10 15 20 25

DATA2000

DATA2001

PID μ momentum (ms 25t FC,1-ring,μ)

0

500

1000

1500

2000

2500

3000

0 250 500 750 1000 1250 1500 1750 2000 P_μ(GeV/c) μ momentum (ms 25t FC,1-ring,μ)

0

200

400

600

800

1000

0 250 500 750 1000 1250 1500 1750 2000

DATA2000

DATA2001

P_μ(GeV/c) μ direction (ms 25t FC,1-ring,μ)

0

500

1000

1500

2000

2500

3000

3500

4000

4500

0 20 40 60 80 100 120 140 160 180 θ_μ μ direction (ms 25t FC,1-ring,μ)

0

200

400

600

800

1000

1200

1400

0 20 40 60 80 100 120 140 160 180

DATA2000

DATA2001

θ_μ

Q^2 (ms 25t FC,1-ring,μ)

0

500

1000

1500

2000

2500

3000

3500

4000

4500

0 0.5 1 1.5 2 2.5 3 Q^2 (GeV^2/c^2)

Q^2 (ms 25t FC,1-ring,μ)

0

200

400

600

800

1000

1200

1400

0 0.5 1 1.5 2 2.5 3

DATA2000

DATA2001

Q^2 (GeV^2/c^2) acceptance (ms 25t,FC,CCQE)

0 500 1000

1500

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

FC+PC

true P_μ (MeV/c)

0 500 1000

1500

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 true P_μ (MeV/c)

FC

0 0.25 0.5 0.75 1

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 true P_μ (MeV/c)

FC/(FC+PC)