CCQE neutrino energy spectrum (GeV)

Data (NUANCE) MC CCQE spectrum

Neutrino Energy (GeV) dN/dE (1/GeV)

0

500

1000

1500

2000

2500

3000

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5