Sci- Fi DATA/MC Ratio and Expected Events at Super- K

Updated: 2001.02.23

Month Jun Nov Jan Feb March May Jun Nov- 00Jun Spills 818158 977399 482426 774344 668392 518029 695891 4116481 Good Spills (SF) 463891 328970 331258 661901 594197 466828 595061 2978215 Good Spills (SK) 651294 728041 425664 768267 667057 475139 688718 3752886 POT 2.2716E18 1.6181E18 1.7292E18 3.4795E18 3.3039E18 2.5115E18 3.2442E18 1.58863E19 CT16sum(SK) 3.0972E18 3.5666E18 2.2193E18 4.0426E18 3.7047E18 2.5557E18 3.7534E18 1.98422E19

MUC 3D: 292 261 289 592 551 421 518 2632 MUC 3D Total: 2924 Events MUC 3D(expected): 328.55 293.67 313.84 631.51 599.63 455.82 588.8 2883.27

Data/MC 0.889 0.889 0.921 0.937 0.919 0.924 0.880 0.913 Stat .052 .055 .054 .039 .039 .045 .039 .018 Syst(+) .098 .082 .085 .087 .085 .085 .081 .084 Syst(- ) .111 .093 .096 .098 .096 .096 .092 .095

SK Expected 4.82 5.68 3.66 6.79 6.10 4.23 5.92 32.40 Stat 0.28 0.35 0.22 0.28 0.26 0.21 0.26 0.63 Syst(+) 0.86 0.64 0.41 0.76 0.69 0.48 0.67 3.65 Syst(- ) 0.78 0.74 0.48 0.88 0.79 0.55 0.77 4.22 Error all (+) 0.90 0.73 0.47 0.81 0.73 0.52 0.72 3.70 (- ) 0.83 0.82 0.52 0.93 0.84 0.59 0.81 4.26 SK Expected total: 37.219 ±.688 st +4.505sys - 4.995sys + 4.558 - 5.042