0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

99-Nov. Average

θ_μ (degree) arbitary unit

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

00-Jan. Average

θ_μ (degree) 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

00-Feb. Average

θ_μ (degree)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

00-Mar. Average

θ_μ (degree) arbitary unit

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

00-May. Average

θ_μ (degree) 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50

00-June Average

θ_μ (degree)