profile x (0.5ΛE_μΛ1GeV)

Fe events (99Nov.-00Jun. DATA vs. MC-250kA)

0 5000

10000

15000

20000

25000

30000

35000

-400 -200 0 200 400

Mean RMS 1.064 216.6

x arbitary unit

profile y (0.5ΛE_μΛ1GeV) 0 5000

10000

15000

20000

25000

30000

35000

40000

-400 -200 0 200 400

Mean RMS 0.6379E-01 222.3

y arbitary unit

profile x (1ΛE_μΛ2.5GeV) 0 2500

5000

7500

10000

12500

15000

17500

20000

22500

-400 -200 0 200 400

Mean RMS 4.217 197.3

x arbitary unit

profile y (1ΛE_μΛ2.5GeV) 0 2500

5000

7500

10000

12500

15000

17500

20000

22500

-400 -200 0 200 400

Mean RMS -8.522 195.5

y arbitary unit