QE detection efficiency

0 250 500 750 1000

1250

1500

1750

2000

2250

0 200 400 600 800 1000 1200 1400 1600 1800 2000 momentum of 1st ring as mu-like (MeV/c)

Φ of events

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 200 400 600 800 1000 1200 1400 1600 1800 2000 momentum of 1st ring as mu-like (MeV/c)

QE detection efficiency

QE fraction in 1R,FCμ sample

0 500 1000

1500

2000

2500

3000

0 200 400 600 800 1000 1200 1400 1600 1800 2000 momentum of 1st ring as mu-like (MeV/c)

Φ of events

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 200 400 600 800 1000 1200 1400 1600 1800 2000 momentum of 1st ring as mu-like (MeV/c)

QE fraction

QE detection efficiency

0 200 400 600 800 1000

1200

1400

1600

1800

2000

0 500 1000 1500 2000 2500 3000 true E_ν(MeV)

Φ of events

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 500 1000 1500 2000 2500 3000 true E_ν(MeV)

QE detection efficiency

QE fraction in 1R,FCμ sample

0 250 500 750 1000

1250

1500

1750

2000

2250

0 500 1000 1500 2000 2500 3000 true E_ν(MeV)

Φ of events

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 500 1000 1500 2000 2500 3000 true E_ν(MeV)

QE fraction