vertex distribution (25t fiducial,1ring,FCμ)

0

100

200

300

400

500

600

700

800

900

-200 -180 -160 -140 -120 -100 -80 -60 -40 -20 0 Z (cm)

Φ of events

vertex distribution (25t fiducial,1ring,FCμ)

0

50

100

150

200

250

300

350

400

0 20 40 60 80 100 120 140 160 180 200 R (cm)

Φ of events/ton

μ direction (25t fiducial,1ring,FCμ)

0

200

400

600

800

1000

-1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1 cosθ_μ

Φ of events

μ momentum (25t fiducial,1ring,FCμ)

0

200

400

600

800

1000

0 200 400 600 800 1000 1200 1400 1600 1800 2000 P_μ (MeV/c)

Φ of events