profile x

Fe events (99Nov. DATA vs. MC-250kA)

0

1000

2000

3000

4000

5000

6000

7000

8000

9000

-400 -300 -200 -100 0 100 200 300 400

Mean RMS -2.449 210.3

x (cm) arbitary unit

DATA MC

profile x

Fe events (99Nov. DATA vs. MC-250kA)

0

1000

2000

3000

4000

5000

6000

7000

8000

9000

-400 -300 -200 -100 0 100 200 300 400

Mean RMS -2.449 210.3

x (cm) arbitary unit

DATA MC

profile y

Fe events (99Nov. DATA vs. MC-250kA)

0

1000

2000

3000

4000

5000

6000

7000

8000

9000

-400 -300 -200 -100 0 100 200 300 400

Mean RMS -4.160 213.2

y (cm) arbitary unit

DATA MC

profile y

Fe events (99Nov. DATA vs. MC-250kA)

0

1000

2000

3000

4000

5000

6000

7000

8000

9000

-400 -300 -200 -100 0 100 200 300 400

Mean RMS -4.160 213.2

y (cm) arbitary unit

DATA MC

profile x (0.5ΛE_μΛ1GeV)

Fe events (99Nov. DATA vs. MC-250kA)

0 1000

2000

3000

4000

5000

-400 -200 0 200 400

Mean RMS -4.164 217.8

x arbitary unit

profile y (0.5ΛE_μΛ1GeV) 0 1000

2000

3000

4000

5000

6000

-400 -200 0 200 400

Mean RMS -3.260 221.7

y arbitary unit

profile x (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

-400 -200 0 200 400

Mean RMS 0.4457 196.9

x arbitary unit

profile y (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

-400 -200 0 200 400

Mean RMS -5.675 198.1

y arbitary unit

profile x (0.5ΛE_μΛ1GeV)

Fe events (99Nov. DATA vs. MC-250kA)

0 1000

2000

3000

4000

5000

-400 -200 0 200 400

Mean RMS -4.164 217.8

x arbitary unit

profile y (0.5ΛE_μΛ1GeV) 0 1000

2000

3000

4000

5000

6000

-400 -200 0 200 400

Mean RMS -3.260 221.7

y arbitary unit

profile x (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

-400 -200 0 200 400

Mean RMS 0.4457 196.9

x arbitary unit

profile y (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

-400 -200 0 200 400

Mean RMS -5.675 198.1

y arbitary unit