profile x

Fe event (99 Nov.)

0

2000

4000

6000

8000

10000

-400 -300 -200 -100 0 100 200 300 400

ALLCHAN 0.8471E+05

15.25 / 13 Constant 6421. 78.15 Mean 1.469 5.378 Sigma 346.8 10.61

x (cm) aubitary unit