Muon energy

Fe events (99Nov.-00June DATA vs. MC-250kA)

0

10000

20000

30000

40000

50000

60000

70000

0 0.5 1 1.5 2 2.5 3

Entries Mean RMS 196008 0.9959 0.3427

E_μ (GeV)

Entries

DATA MC

Muon energy

Fe events (99Nov.-00June DATA vs. MC-250kA)

0

10000

20000

30000

40000

50000

60000

70000

0 0.5 1 1.5 2 2.5 3

Entries Mean RMS 196008 0.9959 0.3427

E_μ (GeV)

Entries

DATA MC