Muon distribution stability (99June - 00June)

0 0.5 1 1.5 2 2.5 3

0 30 reduced χ^2 from std. E_μ spectrum

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30 integrated day (1 data point / 5 days)

0 0.5 1 1.5 2 2.5 3

0 30 reduced χ^2 from std. θ_μ distribution

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30

0 0.5 1 1.5 2 2.5 3

0 30 integrated day (1 data point / 5 days)