Generated E_ν (GeV)

Reconstructed E_ν (GeV)

Generated E_ν (GeV)

Efficiency

Generated E_ν (GeV)

Reconstructed E_ν (GeV)

Generated E_ν (GeV)

Efficiency

0 0.5 1 1.5 2 2.5 3 3.5

0 1 2 3 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0 1 2 3

0 0.5 1 1.5 2 2.5 3 3.5

0 1 2 3 0 0.01

0.02

0.03

0.04

0.05

0 1 2 3