Sci- Fi DATA/MC Ratio and Expected Events at Super- K

Updated: 2000.07.21

Month Jun Nov Jan Feb March May Jun Total Good Spills 464432 328970 331352 662015 595444 466548 595404 3444165

POT 2.27E+018 1.62E+018 1.73E+018 3.48E+018 3.31E+018 2.51E+018 3.25E+018 1.82E+019 CT(SK) 3.10E+018 3.57E+018 2.22E+018 4.04E+018 3.71E+018 2.55E+018 3.75E+018 2.29E+019

MUC 3D 287 263 293 606 564 421 519 2953 Expected 339.73 321.44 343.63 691.33 657.76 498.69 644.77 3497.36

Data/MC 0.845 0.818 0.853 0.877 0.857 0.844 0.805 0.844 ±.05 (St) ±.05 (St) ±.05 (St) ±.036 (St) ±.036 (St) ±.041 (St) ±.035 (St) ±.016 (St) +.079 (Sys) +.077 (Sys) +.08 (Sys) +.082 (Sys) +.08 (Sys) +.079 (Sys) +.076 (Sys) +.079 (Sys) - .083 (Sys) - .08 (Sys) - .084 (Sys) - .086 (Sys) - .084 (Sys) - .083 (Sys) - .079 (Sys) - .083 (Sys)

SK Exp. 5.09 6.11 3.95 7.41 6.65 4.51 6.32 40.04 ±0.30(St) ±0.38(St) ±0.23(St) ±0.30(St) ±0.28(St) ±0.22(St) ±0.28(St) ±0.74(St) + .92(Sys) + .73(Sys) + .47(Sys) + .89(Sys) + .8(Sys) + .54(Sys) + .76(Sys) + 5.12(Sys) - .77(Sys) - .82(Sys) - .53(Sys) - .99(Sys) - .89(Sys) - .6(Sys) - .84(Sys) - 5.44(Sys)