selected track

Fe event rate stability (00-Mar.)

0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

0.1

0 5 10 15 20 25 30 accumulated day (from 01/Mar/00) event rate / 5Ξ10^{12ppp}

0 5000

10000

15000

0.03 0.04 0.05 0.06 0.07

Mean RMS 0.5369E-01 0.1116E-02 1356. / 2 Constant 0.1228E+05 Mean 0.5330E-01 Sigma 0.1524E-02

event / 5Ξ10^{12}ppp