Muon energy

Fe event (run2333-2416)

0

2000

4000

6000

8000

10000

12000

14000

16000

0 0.5 1 1.5 2 2.5 3

Entries Mean RMS OVFLW

41187 0.9968 0.3441 7.000

E_μ(GeV) entries