Systematic error on extrapolation in MC based analysis

-20

-15

-10

-5

0

5

10

15

20

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 P_ν(GeV/c)

Percent systematic error in energy bin

+ 8.0 -7.0

+ 7.6 -6.0

+ 7.3 -9.0

+ 8.3 -5.4

+13.4 -12.6

+14.2 -8.7

Preliminary