Neutrino fluxes expected on beam axis and 1km(4mr) away

10^6

10^7

10^8

10^9

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

At 250km from target (SK position)

P_ν(GeV/c)

Neutrino flux in arbitrary units

On axis flux Off axis flux

Total expected event rate change is about 3 percent