Systematic Errors%

June.99

Nov.99

Jan.00

Feb.00

Mar.00

Fiducial

6 . 0FADCt h r .

1 . 0E-scale

1 . 0BKG

1 . 0Multi-e v e n t

3 . 0FADCE r r

0 . 0+4.8- 0 . 0

0 . 00 . 00 . 0NC()SKexp

+4.1(0.8)-4.8(0.9)

Flux()SKexp

+2.4(1.3)-3.4(1.7)

SKsys.

3 . 0CTn o r m .

2 . 71 . 91 . 10 . 40 . 7n e a r / f a r

+13.8- 9 . 9

+5.8- 7 . 4

Rate

+8.4- 9 . 1

+13.2- 9 . 1

SKexp

+16.0- 1 2 . 9

+14.6- 1 0 . 9

+9.7- 1 0 . 8