SK correlated systematic errorsEff.@1kt

Eff.@SK

SKexp

NCcrosssection

+30%

-4.1%

-3.3%

+0.8%

-30%

+4.8%

+3.9%

-0.9%

Flux+-2.4%

-1.1%

+1.3%

-+3.4%

+1.6%

-1.7%