profile x (corrected)

Muon tracks (Nov, 250kA)

0

2000

4000

6000

8000

10000

12000

-400 -300 -200 -100 0 100 200 300 400

ALLCHAN 0.5381E+05

5.112 / 5 Constant 8131. 128.6 Mean 1.610 6.938 Sigma 352.3 13.08

(cm)

Entries

profile y (corrected)

Muon tracks (Nov, 250kA)

0

2000

4000

6000

8000

10000

12000

-400 -300 -200 -100 0 100 200 300 400

ALLCHAN 0.5486E+05

3.059 / 5 Constant 8488. 128.7 Mean -15.79 6.555 Sigma 332.1 11.72

(cm)

Entries

x (0.5ΛE_μΛ1GeV)

Muon tracks (Nov, 250kA)

0 1000

2000

3000

4000

5000

6000

7000

-400 -200 0 200 400

ALLCHAN 0.3227E+05

4.408 / 5 Constant 4587. 103.4 Mean 2.198 13.94 Sigma 428.7 32.12

y (0.5ΛE_μΛ1GeV) 0 1000

2000

3000

4000

5000

6000

7000

-400 -200 0 200 400

ALLCHAN 0.3304E+05

0.6111 / 5 Constant 4703. 100.5 Mean -11.13 15.31 Sigma 436.1 35.06

x (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

4000

4500

-400 -200 0 200 400

ALLCHAN 0.2154E+05

4.112 / 5 Constant 3550. 74.81 Mean 1.146 6.555 Sigma 287.6 9.913

y (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

4000

4500

-400 -200 0 200 400

ALLCHAN 0.2181E+05

5.024 / 5 Constant 3804. 78.94 Mean -18.42 5.555 Sigma 257.8 7.929

Muon energy

Muon tracks (rΛ3m) (Nov, 250kA)

0

2000

4000

6000

8000

10000

0 0.5 1 1.5 2 2.5 3

Entries Mean RMS OVFLW

28077 0.9724 0.3304 4.000

Energy (GeV)

Entries

E_μ (rΛ0.5m)

Muon tracks (Nov, 250kA)

0 100 200 300

0 1 2 3

Entries Mean RMS OVFLW

1098 1.015 0.3455 0.000

E_μ (0.5ΛrΛ1m) 0 250 500 750 1000

0 1 2 3

Entries Mean RMS OVFLW

2959 1.006 0.3413 0.000

E_μ (1ΛrΛ1.5m) 0 500 1000

1500

0 1 2 3

Entries Mean RMS OVFLW

4732 0.9970 0.3393 0.000

E_μ (1.5ΛrΛ2m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

5950 0.9854 0.3349 2.000

E_μ (2ΛrΛ2.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

6768 0.9600 0.3265 0.000

E_μ (2.5ΛrΛ3m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

6570 0.9335 0.3110 2.000

E_μ (3ΛrΛ3.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

5642 0.9097 0.3005 1.000

E_μ (rΓ3.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

5660 0.8473 0.2931 1.000

Muon angle

Muon tracks (rΛ3m) (Nov, 250kA)

0

1000

2000

3000

4000

5000

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Entries Mean RMS OVFLW

28077 0.5640 0.3255 250.0

tanθ

Entries