profile x (corrected)

Muon tracks (run1140-1276)

0

2000

4000

6000

8000

10000

12000

-400 -300 -200 -100 0 100 200 300 400

ALLCHAN 0.5417E+05

3.142 / 5 Constant 8181. 130.3 Mean 12.90 7.203 Sigma 356.3 13.43

(cm)

Entries

profile y (corrected)

Muon tracks (run1140-1276)

0

2000

4000

6000

8000

10000

12000

-400 -300 -200 -100 0 100 200 300 400

ALLCHAN 0.5543E+05

0.9058 / 5 Constant 8290. 126.6 Mean -21.75 8.042 Sigma 366.5 15.68

(cm)

Entries

x (0.5ΛE_μΛ1GeV)

Muon tracks (run1140-1276)

0 1000

2000

3000

4000

5000

6000

7000

-400 -200 0 200 400

ALLCHAN 0.3389E+05

4.862 / 5 Constant 4804. 107.4 Mean 10.06 14.51 Sigma 437.4 33.42

y (0.5ΛE_μΛ1GeV) 0 1000

2000

3000

4000

5000

6000

7000

-400 -200 0 200 400

ALLCHAN 0.3484E+05

0.5040 / 5 Constant 4819. 102.1 Mean -11.66 19.85 Sigma 497.8 51.63

x (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

4000

4500

-400 -200 0 200 400

ALLCHAN 0.2028E+05

5.923 / 5 Constant 3383. 71.59 Mean 13.00 6.344 Sigma 282.3 9.158

y (1ΛE_μΛ2.5GeV) 0 500 1000

1500

2000

2500

3000

3500

4000

4500

-400 -200 0 200 400

ALLCHAN 0.2058E+05

1.948 / 5 Constant 3498. 72.81 Mean -27.37 6.229 Sigma 272.3 9.051

Muon energy

Muon tracks (rΛ3m) (run1140-1276)

0

2000

4000

6000

8000

10000

0 0.5 1 1.5 2 2.5 3

Entries Mean RMS OVFLW

27985 0.9530 0.3244 5.000

Energy (GeV)

Entries

E_μ (rΛ0.5m)

Muon tracks (run1140-1276)

0 100 200 300

0 1 2 3

Entries Mean RMS OVFLW

1037 0.9912 0.3292 0.000

E_μ (0.5ΛrΛ1m) 0 250 500 750 1000

0 1 2 3

Entries Mean RMS OVFLW

3009 0.9809 0.3372 0.000

E_μ (1ΛrΛ1.5m) 0 500 1000

1500

0 1 2 3

Entries Mean RMS OVFLW

4569 0.9753 0.3290 1.000

E_μ (1.5ΛrΛ2m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

6045 0.9593 0.3301 0.000

E_μ (2ΛrΛ2.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

6565 0.9520 0.3249 0.000

E_μ (2.5ΛrΛ3m) 0 1000

2000

0 1 2 3

Entries Mean RMS OVFLW

6760 0.9149 0.3051 4.000

E_μ (3ΛrΛ3.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

5925 0.8919 0.3040 1.000

E_μ (rΓ3.5m) 0 500 1000

1500

2000

0 1 2 3

Entries Mean RMS OVFLW

5661 0.8468 0.2992 1.000

Muon angle

Muon tracks (rΛ3m) (run1140-1276)

0

1000

2000

3000

4000

5000

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Entries Mean RMS OVFLW

27985 0.5702 0.3251 205.0

tanθ

Entries