Comparing our MC to our data

0

2

4

6

8

10

12

14

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries Mean RMS 64 2.3 0.8

Value for MC model: 1.7

Gcalor value: 12.

χ^2/(d.o.f.=4)

Cases per bin in χ^2