(Relative) results of 64 alternate nuclear models

0 2 4 6 8 10 12 14 16 18 20

-10 -7.5 -5 -2.5 0 2.5 5 7.5 10

Entries Mean RMS 64 -0.4 1.8

Percent deviation from standard analysis

Cases represented per Ψ bin