The bottom line:

Systematic error on ν interaction rates

Nuclear models^{+5%}_{−6%} 9Be →^{27} Al ±1% ⃗B field^{+2%}_{−3%} ⃗B in target_{small}

proton centering^{+0%}_{−2%} proton profile^{+2%}_{−3%} target sagging^{+0%}_{−2%} add linearly

=⇒ From MC based extrapolation: Nμ(SK) = N0 ± (stats) NFD·X· (V SK VFD ) ±1% MC stats +8% −10% MC syst