Vertex x (0.5ΛEΛ1GeV)

Contained muon tracks on 250kA

0 50 100 150 200 250 300

-400 -200 0 200 400

Entries Mean RMS 1686 -2.550 187.3

Vertex x (1GeVΛE) 0 20 40 60 80 100 120 140 160 180

-400 -200 0 200 400

Entries Mean RMS 948 11.81 175.4

Vertex y (0.5ΛEΛ1GeV) 0 50 100 150 200 250 300 350

-400 -200 0 200 400

Entries Mean RMS 1686 -11.09 174.1

Vertex y (1GeVΛE) 0 25 50 75 100 125 150 175 200

-400 -200 0 200 400

Entries Mean RMS 948 -2.426 164.6