# of observed events and expected events 1999/06-2001/04 Δm^2(×10^{−3}eV^2) Obs. No Ocsi. 3 5 7 FC 22.5kt 44 63.9^{+6.1}_{−6.6} 41.5 27.4 23.1 1-ring 26 38.4±5.5 22.3 14.1 13.1 μ-like 24 34.9±5.5 19.3 11.6 10.7 e-like 2 3.5±1.4 2.9 2.5 2.4 multi

ring 18 25.5±4.3 19.3 13.3 10.0