data summary and expected number of events

data No osc. 3 × 10^{−3} 5 × 10^{−3} 7 × 10^{−3} F.C. events in fid. vol. 3 12.3^{+1.7}_{−1.9} 8.0^{+1.2}_{−1.3} 5.4^{+0.8}_{−0.9} 4.6^{+0.7}_{−0.8} out of fid. 3 5.5^{+1.1}_{−1.2} 3.5^{+0.7}_{−0.8} 2.4^{+0.5}_{−0.5} 2.1^{+0.4}_{−0.5}

O.D. events crossing 2 4.2 ± 1.6 3.2 2.0 1.3 contained 4 8.7 ± 3.3 5.5 3.5 2.9